10^0 10^1 10^2 10^3 10^4 10^5 10^6

10^{-1}

10^0

10^1

10^2

10^3

Tp [GeV] ξσppπ [mb]

Geant 4 Fluka Pythia 8 (SoftQCD) Pythia 8 (HardQCD) Fit-formula Dermer (1986) SIBYLL QGSJET